-1 0

Net TOA (W m -2)

14 14.5 15

T2m (°C)

18.6

18.8 19

SST ( °C)

33.9 34 34.1

SSS (g kg -1)

1000 1100 1200 1300 1400 1500 1600 1700 1800 1900 2000 15 20 25

AMOC 26.5 °N (Sv)